14-pin header header for

ADC

V+ S- S+ V-

60-pin flat cable header for

GTFE probe card

60-pin flat cable header for

GTRC probe card

LVDS 3.3VCMOS

8 sense lines

LVDS

3.3V CMOS

LVDS 3.3VCMOS LVDS

3.3V CMOS

50-pin flat cable header

50-pin flat cable header

4-pin

MOLEX

Voltage regulators

AVDD

AVDD2

DVDD

+5V

7 pairs 6 pairs

18 pairs 18 lines 17 pairs 18 lines 18 pairs

18 pairs 7 lines 7 lines

LVDD

+2.5V

10

3.3 V fixed

follow DVDD

10

36-pin header

22-pin header

9 lines delay

2 lines

18 GND�s

7 GND�s

11 GND�s

V+ S- S+ V-

V+ S- S+ V-

V+ S- S+ V-

8 GND�s

1-14

15-50

51

52

60

59

58

57

56

54

55

53

56

55

58

57

60

59

47-54

1-12

13-46

+

+

+

To all chips on this board

0

0

0

Support board for GTFE/RC probe cards