Binary Runsheet STEP12Bias ATT7 = 250VRun #configfileMagnetOn/OffAngleEventstakenDateGlobalEff.Med.PulseHeigthTDCOTNoisePos.Resol-utionZ-modS/NInter-StripEff.Mult.

2490binary_mag_0.6fCON19.510k8/6/96 * * * * * **

2491binary_mag_0.8fCON19.510k8/6/96 * * * * * **

2492binary_mag_1.0fCON19.525k8/6/96 * * * * * **

2493binary_mag_1.2fCON19.510k8/6/96 * * * * * **

2494binary_mag_1.4fCON19.510k8/6/96 * * * * * **

2495binary_mag_2.0fCON19.510k8/6/96 * * * *

2496binary_mag_2.5fCON19.510k8/6/96 * * * *

2497binary_mag_3.0fCON19.510k8/6/96 * * * *

2498binary_mag_3.5fCON19.510k8/6/96 * * * *

2499binary_mag_4.0fCON19.510k8/6/96 * * * *