Binary Runsheet STEP6Bias ATT7 = 250VRun #configfileMagnetOn/OffAngleEventsTakenDateGlobalEffic.Med.PulseHeigthTDCOTNoisePos.Resol-utionZ-modS/NInterStripEffMult.

2425binary_mag_0.6fCON-320k8/4/96 ** ** ** ** * **

2426binary_mag_0.8fCON-320k8/4/96 ** ** ** ** * **

242724282429binary_mag_1.0fCON-37k15K20K8/4/96 ** ** ** ** ** * **

2430binary_mag_1.2fCON-320k8/4/96 ** ** * ** * **

24312432binary_mag_1.4fCON-310k10k8/4/96 ** ** * ** * **

2433binary_mag_2.0fCON-320k8/4/96 ** ** * *

2434binary_mag_2.5fCON-320k8/4/96 ** ** * *

2436binary_mag_3.0fCON-325k8/4/96 ** ** ** * *

2437binary_mag_3.5fCON-325k8/4/96 ** ** * *

2438binary_mag_4.0fCON-325k8/4/96 ** ** * *