0.950.960.970.980.991-20-100102030H8_96 Efficiency in B-Field of 1.56T

Efficiency Chip 1Efficiency Chip 0 -B=0-Efficiency Chip 1 -B=0-

Tracking Efficiency Rotation Angle [o]