00.511.52- 1 0 - 5 051 0 1 5 2 0 2 5 3 0 H 8 _ 9 6 Cluster Multiplicity

Att8 chip 0Att8 chip 1

Cluster MultiplicityRotation Angle [o]Lorentz Angle [o]:12.910.9