0.004.008.0012.0016.0020.000.004.008.0012.0016.0020.0004 0 8 0 120160200N1N4N1+N4N5

Interstrip Capacitance [pF]ATLAS nn 80AC - Interstrip Capacitance (reg 3)N1: 1 neighbor; N4: next 4 neighbors over; N1+N4: both curves added; N5: 5 neighborsVbias