�

log10(energy)

2 2.5 3 3.5 4 4.5 5 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 delangle<1.5

delangle<2.5

delangle<3.5

delangle<4.5

Efficiency to be fit in the bin trigtype==4

log10(energy)

2 2.5 3 3.5 4 4.5 5 0

0.2

0.4

0.6

0.8

1 delangle<1.5

delangle<2.5

delangle<3.5

delangle<4.5

Efficiency to be fit in the bin trigtype==4 rcore_mc<50m

log10(energy)

2 2.5 3 3.5 4 4.5 5 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 delangle<1.5

delangle<2.5

delangle<3.5

delangle<4.5

Efficiency to be fit in the bin trigtype==4 old core fitter

nhitas

20 30 40 50 60 70 80 90 100 0

1000

2000

3000

4000

5000

6000 2 x10 nhitas energy<500GeV all triggers

nfit>0

delangle<2.2

nhitas

20 30 40 50 60 70 80 90 100 0

500

1000

1500

2000

2500

3000 2 x10 nhitas energy<500GeV rcore_mc<40m all triggers

nfit>0

delangle<2.2

nhitas

20 25 30 35 40 45 50 55 0

1000

2000

3000

4000

5000

6000 2 x10 nhitas energy<500 GeV trigger 4 only

nfit>0

delangle<2.2

nhitas

20 25 30 35 40 45 50 55 0

500

1000

1500

2000

2500

3000 2 x10 nhitas energy<500GeV rcore_mc<40m trigger 4 only

delangle<2.2 nfit>0

htemp

Entries 12223

Mean 2.062

RMS 1.731

delangle

0 2 4 6 8 10 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

2400 3 x10 delangle trigger 1 htemp

Entries 4519

Mean 2.659

RMS 2.005

delangle

0 2 4 6 8 10 0 1000

2000

3000

4000

5000

6000

7000 2 x10 htemp

delangle trigger 2

htemp

Entries 8780

Mean 2.897

RMS 1.943

delangle

0 2 4 6 8 10 0

2000

4000

6000

8000

10000

2 x10 delangle trigger 3^{htemp}_{Entries 3829}

Mean 2.443

RMS 1.687

delangle

0 2 4 6 8 10 0 500 1000

1500

2000

2500

3000

3500

4000 2 x10 htemp

Entries 3829

delangle E<500GeV

trigger 1 trigger 2 trigger 3 htemp

Entries 4130

Mean 20.19

RMS 5.73

nfit

5 10 15 20 25 30 35 40 0 200 400 600 800 1000

1200

1400

1600

1800 3 x10 nfit trigtype==4

delangle>2.2

delangle<2.2

�

�

�

�

�

�

�

�

�

�

�

�

�

�

tchi

-50 -40 -30 -20 -10 0 10 20 0

1

2

3

4

5

6 All Used in Fit delangle 6.60 nhitas 29 nfit 18 rcore_mc 2756.77 m theta_mc 16.51 theta 20.75 chisq 0.113 chisq_mc 0.164 mc chisq 0.866 chisq mct 1.076

Fit Angle

tchi

-50 -40 -30 -20 -10 0 10 20 0 0.5 1 1.5 2 2.5 3 3.5 4 MC Angle

�

tchi

-50 -40 -30 -20 -10 0 10 20 0

0.5

1

1.5

2

2.5

3 All Used in Fit delangle 11.12 nhitas 20 nfit 12 rcore_mc 4033.52 m theta_mc 34.27 theta 37.63 chisq 0.153 chisq_mc 0.250 mc chisq 1.239 chisq mct 1.492

Fit Angle

tchi

-50 -40 -30 -20 -10 0 10 20 0

0.5

1

1.5

2

2.5

3 MC Angle

�

tchi

-50 -40 -30 -20 -10 0 10 20 0

0.5

1

1.5

2

2.5

3 All Used in Fit delangle 11.12 nhitas 20 nfit 12 rcore_mc 4033.52 m theta_mc 34.27 theta 37.63 chisq 0.153 chisq_mc 0.250 mc chisq 1.239 chisq mct 1.492

Fit Angle

tchi

-50 -40 -30 -20 -10 0 10 20 0

0.5

1

1.5

2

2.5

3 MC Angle

�

�

�