ALCPG Tracking Meeting

FOCUS ON GASEOUS TRACKING

November 26, 2002 12:00 PM Pacific Standard Time

Preparations for Arlington: I

Some effort is turning towards identifying and developing test-beam facilities for LC R&D.

Review of facilities put forward by Gene Fisk at Korean LCWS

http://scipp.ucsc.edu/~schumm/lctrack/ testbeam/Fisk.ppt

All tracking hardware groups will be asked to provide projetions of test-beam needs

) Questionaire coming within week or so ) Be prepared for fleshed-out discussion at Arlington

Preparations for Arlington: II

We will have four (4) 90’ parallel sessions at Arlington, plus an ALCPG-wide discussion of test-beam facilities.

Rough format (dovetails with CAL sessions):i

SESSIONS I & II

ffl 20’ Introduction ffl 70’ + 90’ Hardware talks (individual groups)

SESSIONS III & IV

ffl 90’ + 60’ Simulation talks (individual groups) ffl 30’ Discussion of test-beam issues ) Average of 15-20 minutes per group presentation

Proposal Review Status (Nothing New)

Proposals submitted to DOE, NSF on October 24

ffl $500 K for detector R&D from DOE ffl NSF support expected to be similar, but less certain ffl DOE will accept Steering Group review, commensurate

with existing knowledge of existing groups

ffl NSF procedure less clear

Overall timeline not definite in either case. Steering group is currently trying to find out more (stay tuned).

Future Meetings

We will probably continue with this format to keep in touch between ALCPG (which occur at roughly 6 month intervals).

Should we switch to WEB conferencing? (VRVS? Other?)

) Think about for closing discussion.