Patch Rates

0

2

4

6

8

10

12

14

1 2 3 4 5 6 7 8 9 10 11 12 13

NPMTs in Patch

Ln(Rate (sec-1)) > NPMTs

Patch 38

Patch 37

Patch 37 ^ 38